DROP DATABASE IF EXISTS ##;
-- !
CREATE DATABASE IF NOT EXISTS ## CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;
-- !
USE ##;
-- !
!! db_init_sqlite.sql